\vspace{-0.8cm}
\section{Interfaces}

%\vspace{-1.6cm}



%\vspace{2cm}

% \resizebox*{\columnwidth}{!}{\includegraphics{img/interface.png}}
% \centering
% \small
% \textbf{Example interface}


\vspace{-1cm}


%\resizebox*{\columnwidth}{!}{\includegraphics{images/blockdiagram.pdf}} 

