
b@12: % Generated by IEEEtran.bst, version: 1.12 (2007/01/11)
b@12: \begin{thebibliography}{1}
b@12: \providecommand{\url}[1]{#1}
b@12: \csname url@samestyle\endcsname
b@12: \providecommand{\newblock}{\relax}
b@12: \providecommand{\bibinfo}[2]{#2}
b@12: \providecommand{\BIBentrySTDinterwordspacing}{\spaceskip=0pt\relax}
b@12: \providecommand{\BIBentryALTinterwordstretchfactor}{4}
b@12: \providecommand{\BIBentryALTinterwordspacing}{\spaceskip=\fontdimen2\font plus
b@12: \BIBentryALTinterwordstretchfactor\fontdimen3\font minus
b@12:   \fontdimen4\font\relax}
b@12: \providecommand{\BIBforeignlanguage}[2]{{%
b@12: \expandafter\ifx\csname l@#1\endcsname\relax
b@12: \typeout{** WARNING: IEEEtran.bst: No hyphenation pattern has been}%
b@12: \typeout{** loaded for the language `#1'. Using the pattern for}%
b@12: \typeout{** the default language instead.}%
b@12: \else
b@12: \language=\csname l@#1\endcsname
b@12: \fi
b@12: #2}}
b@12: \providecommand{\BIBdecl}{\relax}
b@12: \BIBdecl
b@12: 
b@12: \bibitem{deman2014b}
b@12: B.~De~Man and J.~D. Reiss, ``{APE}: {A}udio {P}erceptual {E}valuation toolbox
b@12:   for {MATLAB},'' in \emph{136th Convention of the Audio Engineering Society},
b@12:   April 2014.
b@12: 
b@12: \end{thebibliography}




