
b@1402: %%
b@1402: %% This is file `acmcopyright.sty',
b@1402: %% generated with the docstrip utility.
b@1402: %%
b@1402: %% The original source files were:
b@1402: %%
b@1402: %% acmcopyright.dtx  (with options: `style')
b@1402: %% 
b@1402: %% IMPORTANT NOTICE:
b@1402: %% 
b@1402: %% For the copyright see the source file.
b@1402: %% 
b@1402: %% Any modified versions of this file must be renamed
b@1402: %% with new filenames distinct from acmcopyright.sty.
b@1402: %% 
b@1402: %% For distribution of the original source see the terms
b@1402: %% for copying and modification in the file acmcopyright.dtx.
b@1402: %% 
b@1402: %% This generated file may be distributed as long as the
b@1402: %% original source files, as listed above, are part of the
b@1402: %% same distribution. (The sources need not necessarily be
b@1402: %% in the same archive or directory.)
b@1402: %% \CharacterTable
b@1402: %%  {Upper-case    \A\B\C\D\E\F\G\H\I\J\K\L\M\N\O\P\Q\R\S\T\U\V\W\X\Y\Z
b@1402: %%   Lower-case    \a\b\c\d\e\f\g\h\i\j\k\l\m\n\o\p\q\r\s\t\u\v\w\x\y\z
b@1402: %%   Digits        \0\1\2\3\4\5\6\7\8\9
b@1402: %%   Exclamation   \!     Double quote  \"     Hash (number) \#
b@1402: %%   Dollar        \$     Percent       \%     Ampersand     \&
b@1402: %%   Acute accent  \'     Left paren    \(     Right paren   \)
b@1402: %%   Asterisk      \*     Plus          \+     Comma         \,
b@1402: %%   Minus         \-     Point         \.     Solidus       \/
b@1402: %%   Colon         \:     Semicolon     \;     Less than     \<
b@1402: %%   Equals        \=     Greater than  \>     Question mark \?
b@1402: %%   Commercial at \@     Left bracket  \[     Backslash     \\
b@1402: %%   Right bracket \]     Circumflex    \^     Underscore    \_
b@1402: %%   Grave accent  \`     Left brace    \{     Vertical bar  \|
b@1402: %%   Right brace   \}     Tilde         \~}
b@1402: \NeedsTeXFormat{LaTeX2e}
b@1402: \ProvidesPackage{waccopyright}
b@1402: [2014/06/29 v1.2 Copyright statemens for ACM classes]
b@1402: \newif\if@printcopyright
b@1402: \@printcopyrighttrue
b@1402: \newif\if@printpermission
b@1402: \@printpermissiontrue
b@1402: \newif\if@acmowned
b@1402: \@acmownedtrue
b@1402: \RequirePackage{xkeyval}
b@1402: \define@choicekey*{ACM@}{acmcopyrightmode}[%
b@1402:   \acm@copyrightinput\acm@copyrightmode]{none,acmcopyright,acmlicensed,%
b@1402:   rightsretained,usgov,usgovmixed,cagov,cagovmixed,%
b@1402:   licensedusgovmixed,licensedcagovmixed,othergov,licensedothergov,waclicense}{%
b@1402:   \@printpermissiontrue
b@1402:   \@printcopyrighttrue
b@1402:   \@acmownedtrue
b@1402:   \ifnum\acm@copyrightmode=0\relax % none
b@1402:    \@printpermissionfalse
b@1402:    \@printcopyrightfalse
b@1402:    \@acmownedfalse
b@1402:   \fi
b@1402:   \ifnum\acm@copyrightmode=2\relax % acmlicensed
b@1402:    \@acmownedfalse
b@1402:   \fi
b@1402:   \ifnum\acm@copyrightmode=3\relax % rightsretained
b@1402:    \@acmownedfalse
b@1402:   \fi
b@1402:   \ifnum\acm@copyrightmode=4\relax % usgov
b@1402:    \@printpermissiontrue
b@1402:    \@printcopyrightfalse
b@1402:    \@acmownedfalse
b@1402:   \fi
b@1402:   \ifnum\acm@copyrightmode=6\relax % cagov
b@1402:    \@acmownedfalse
b@1402:   \fi
b@1402:   \ifnum\acm@copyrightmode=8\relax % licensedusgovmixed
b@1402:    \@acmownedfalse
b@1402:   \fi
b@1402:   \ifnum\acm@copyrightmode=9\relax % licensedcagovmixed
b@1402:    \@acmownedfalse
b@1402:   \fi
b@1402:   \ifnum\acm@copyrightmode=10\relax % othergov
b@1402:    \@acmownedtrue
b@1402:   \fi
b@1402:   \ifnum\acm@copyrightmode=11\relax % licensedothergov
b@1402:    \@acmownedfalse
b@1402:    \@printcopyrightfalse
b@1402:   \fi
b@1402:   \ifnum\acm@copyrightmode=12\relax % waclicense
b@1402:    \@acmownedfalse
b@1402:   \fi}
b@1402: \def\setcopyright#1{\setkeys{ACM@}{acmcopyrightmode=#1}}
b@1402: \setcopyright{acmcopyright}
b@1402: \def\@copyrightowner{%
b@1402:   \ifcase\acm@copyrightmode\relax % none
b@1402:   \or % acmcopyright
b@1402:   ACM.
b@1402:   \or % acmlicensed
b@1402:   Copyright held by the owner/author(s). Publication rights licensed to
b@1402:   ACM.
b@1402:   \or % rightsretained
b@1402:   Copyright held by the owner/author(s).
b@1402:   \or % usgov
b@1402:   \or % usgovmixed
b@1402:   ACM.
b@1402:   \or % cagov
b@1402:   Crown in Right of Canada.
b@1402:   \or %cagovmixed
b@1402:   ACM.
b@1402:   \or %licensedusgovmixed
b@1402:   Copyright held by the owner/author(s). Publication rights licensed to
b@1402:   ACM.
b@1402:   \or %licensedcagovmixed
b@1402:   Copyright held by the owner/author(s). Publication rights licensed to
b@1402:   ACM.
b@1402:   \or % othergov
b@1402:   ACM.
b@1402:   \or % licensedothergov
b@1402:   \or % waclicense
b@1402:   Copyright held by the owner/author(s).
b@1402:   \fi}
b@1402: \def\@copyrightpermission{%
b@1402:   \ifcase\acm@copyrightmode\relax % none
b@1402:   \or % acmcopyright
b@1402:    Permission to make digital or hard copies of all or part of this
b@1402:    work for personal or classroom use is granted without fee provided
b@1402:    that copies are not made or distributed for profit or commercial
b@1402:    advantage and that copies bear this notice and the full citation on
b@1402:    the first page. Copyrights for components of this work owned by
b@1402:    others than ACM must be honored. Abstracting with credit is
b@1402:    permitted. To copy otherwise, or republish, to post on servers or to
b@1402:    redistribute to lists, requires prior specific permission
b@1402:    and\hspace*{.5pt}/or  a fee. Request permissions from
b@1402:    permissions@acm.org.
b@1402:   \or % acmlicensed
b@1402:    Permission to make digital or hard copies of all or part of this
b@1402:    work for personal or classroom use is granted without fee provided
b@1402:    that copies are not made or distributed for profit or commercial
b@1402:    advantage and that copies bear this notice and the full citation on
b@1402:    the first page. Copyrights for components of this work owned by
b@1402:    others than the author(s) must be honored. Abstracting with credit
b@1402:    is permitted.  To copy otherwise, or republish, to post on servers
b@1402:    or to  redistribute to lists, requires prior specific permission
b@1402:    and\hspace*{.5pt}/or  a fee. Request permissions from
b@1402:    permissions@acm.org.
b@1402:   \or % rightsretained
b@1402:    Permission to make digital or hard copies of part or all of this work
b@1402:    for personal or classroom use is granted without fee provided that
b@1402:    copies are not made or distributed for profit or commercial advantage
b@1402:    and that copies bear this notice and the full citation on the first
b@1402:    page. Copyrights for third-party components of this work must be
b@1402:    honored. For all other uses, contact the
b@1402:    owner\hspace*{.5pt}/author(s).
b@1402:   \or % usgov
b@1402:    This paper is authored by an employee(s) of the United States
b@1402:    Government and is in the public domain. Non-exclusive copying or
b@1402:    redistribution is allowed, provided that the article citation is
b@1402:    given and the authors and agency are clearly identified as its
b@1402:    source.
b@1402:   \or % usgovmixed
b@1402:    ACM acknowledges that this contribution was authored or co-authored
b@1402:    by an employee, or contractor of the national government. As such,
b@1402:    the Government retains a nonexclusive, royalty-free right to
b@1402:    publish or reproduce this article, or to allow others to do so, for
b@1402:    Government purposes only. Permission to make digital or hard copies
b@1402:    for personal or classroom use is granted. Copies must bear this
b@1402:    notice and the full citation on the first page. Copyrights for
b@1402:    components of this work owned by others than ACM must be
b@1402:    honored. To copy otherwise, distribute, republish, or post,
b@1402:    requires prior specific permission and\hspace*{.5pt}/or a
b@1402:    fee. Request permissions from permissions@acm.org.
b@1402:   \or % cagov
b@1402:    This article was authored by employees of the Government of Canada.
b@1402:    As such, the Canadian government retains all interest in the
b@1402:    copyright to this work and grants to ACM a nonexclusive,
b@1402:    royalty-free right to publish or reproduce this article, or to allow
b@1402:    others to do so, provided that clear attribution is given both to
b@1402:    the authors and the Canadian government agency employing them.
b@1402:    Permission to make digital or hard copies for personal or classroom
b@1402:    use is granted. Copies must bear this notice and the full citation
b@1402:    on the first page.  Copyrights for components of this work owned by
b@1402:    others than the Canadain Government must be honored. To copy
b@1402:    otherwise, distribute, republish, or post, requires prior specific
b@1402:    permission and\hspace*{.5pt}/or a fee. Request permissions from
b@1402:    permissions@acm.org.
b@1402:   \or % cagovmixed
b@1402:    ACM acknowledges that this contribution was co-authored by an
b@1402:    affiliate of the national government of Canada. As such, the Crown
b@1402:    in Right of Canada retains an equal interest in the copyright.
b@1402:    Reprints must include clear attribution to ACM and the author's
b@1402:    government agency affiliation.  Permission to make digital or hard
b@1402:    copies for personal or classroom use is granted.  Copies must bear
b@1402:    this notice and the full citation on the first page. Copyrights for
b@1402:    components of this work owned by others than ACM must be honored.
b@1402:    To copy otherwise, distribute, republish, or post, requires prior
b@1402:    specific permission and\hspace*{.5pt}/or a fee. Request permissions
b@1402:    from permissions@acm.org.
b@1402:   \or % licensedusgovmixed
b@1402:    Publication rights licensed to ACM. ACM acknowledges that this
b@1402:    contribution was authored or co-authored by an employee, contractor
b@1402:    or affiliate of the United States government. As such, the
b@1402:    Government retains a nonexclusive, royalty-free right to publish or
b@1402:    reproduce this article, or to allow others to do so, for Government
b@1402:    purposes only.
b@1402:   \or % licensedcagovmixed
b@1402:    Publication rights licensed to ACM. ACM acknowledges that this
b@1402:    contribution was authored or co-authored by an employee, contractor
b@1402:    or affiliate of the national government of Canada. As such, the
b@1402:    Government retains a nonexclusive, royalty-free right to publish or
b@1402:    reproduce this article, or to allow others to do so, for Government
b@1402:    purposes only.
b@1402:   \or % othergov
b@1402:    ACM acknowledges that this contribution was authored or co-authored
b@1402:    by an employee, contractor or affiliate of a national government. As
b@1402:    such, the Government retains a nonexclusive, royalty-free right to
b@1402:    publish or reproduce this article, or to allow others to do so, for
b@1402:    Government purposes only.
b@1402:   \or % licensedothergov
b@1402:    Publication rights licensed to ACM. ACM acknowledges that this
b@1402:    contribution was authored or co-authored by an employee, contractor
b@1402:    or affiliate of a national government. As such, the Government
b@1402:    retains a nonexclusive, royalty-free right to publish or reproduce
b@1402:    this article, or to allow others to do so, for Government purposes
b@1402:    only.
b@1402:   \or % waclicense
b@1402:    \includegraphics[scale=.39]{cc}\\ Licensed under a Creative Commons Attribution 4.0 International License (CC BY 4.0). Attribution: owner/author(s).
b@1402:   \fi}
b@1402: \endinput
b@1402: %%
b@1402: %% End of file `acmcopyright.sty'.




